
                           Welcome to the 
                     EnlightenDSM Network Installer

-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-

Basics

No files are transferred or modified in this installation process until
you go to Step 5: Install and click on the Start Installation button.
If you make a mistake, it's no problem; just go back and put in the
correct information.

The EnlightenDSM Network Installer allows you to install EnlightenDSM
components to any rexec-connectable host. As the installation relies on
rexec functionality, please be sure to have the rexec service
registered on any machine that you want to install EnlightenDSM components
on. Also, be aware your configuration information is verified "on the
fly"; a slow network will cause the installation to go slowly.

Although this verification can slow down host configuration
considerably, it does allow for unattended installations (when you
click on "install" during step 4, everything should go smoothly.

Note: The EnlightenDSM Network Installer is SIGINT and SIGHUP aware. If
you want to kill the EnlightenDSM Network Installer or cancel any
operation, type <Ctrl>-c in the window where you started this process.
EnlightenDSM will then prompt you to confirm your action.

Any errors, as well as successful progress, will be reported in the
Installation Log section.

-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-
(c) 1996 - 1999 Enlighten Software Solutions, Inc.
